/*
  Warnings:

  - You are about to drop the column `notificationStatus` on the `application_monitoring_notifications` table. All the data in the column will be lost.
  - You are about to drop the column `notificationStatus` on the `server_monitoring_notifications` table. All the data in the column will be lost.

*/
-- AlterTable
ALTER TABLE "application_monitoring_notifications" DROP COLUMN "notificationStatus";

-- AlterTable
ALTER TABLE "server_monitoring_notifications" DROP COLUMN "notificationStatus";
