/*
  Warnings:

  - Added the required column `notificationText` to the `application_monitoring_notifications` table without a default value. This is not possible if the table is not empty.
  - Added the required column `notificationText` to the `server_monitoring_notifications` table without a default value. This is not possible if the table is not empty.

*/
-- AlterTable
ALTER TABLE "application_monitoring_notifications" ADD COLUMN     "notificationText" TEXT NOT NULL;

-- AlterTable
ALTER TABLE "server_monitoring_notifications" ADD COLUMN     "notificationText" TEXT NOT NULL;
